<script>
	export default {
		onLaunch: function() {
			console.log('App Launch')
      // this.initLoginStatus();
		},
		onShow: function() {
			console.log('App Show')
		},
		onHide: function() {
			console.log('App Hide')
		},
    methods:{
      async initLoginStatus() {
        try {
          uni.showLoading({
            title: '初始化中...',
            mask: true
          });
          
          // 初始化登录
          const success = await initLogin();
          
          if (success) {
            console.log('登录状态初始化成功');
          } else {
            throw new Error('登录状态初始化失败');
          }
        } catch (error) {
          console.error('登录状态初始化失败:', error);
          uni.showToast({
            title: '自动登录失败，请手动登录',
            icon: 'none'
          });
        } finally {
          uni.hideLoading();
        }
      }
    }
	}
</script>

<style>
	/*每个页面公共css */
</style>
